\documentclass[a4paper,12pt]{article}
\newcommand\ds{\displaystyle}
\begin{document}

\parindent=0pt

QUESTION

Determine whether or not the series
$\ds\sum_{k=0}^\infty\frac{k+1}{k+4}$ is convergent.

\bigskip

ANSWER

$\ds
u_k=\frac{k+1}{k+4}=\frac{k(1+\frac{1}{k})}{k(1+\frac{4}{k})}=
\frac{1+\frac{1}{k}}{1+\frac{4}{k}}\to\frac{1}{1}=1$ as
$k\to\infty$ \\ The terms tend to 1 therefore the series is not
convergent.




\end{document}
